Copyright: (C) 1993-1996, Chips and Technologies, Inc.


Chips Driver Control Panel

Commands

Screen Size

Color

DPI

Display

Monitor Selection

Refresh

Cursor Animation

Big Cursor

OK

Cancel

Version

Help


Screen Size

This allows you to select the screen size.


Color

This allows you to select the number of colors. The colors that are not supported in a particular screen size are grayed out.


DPI

This allows you to change the Font Size.


Display

This allows you to select the desired display type.

CRT: If CRT is selected, then the display will be on the CRT monitor ONLY.

LCD: If LCD is selected, then the display will be on the LCD(flat panel) ONLY.

BOTH: If BOTH is selected, then the display will be on both the LCD(flat panel) and the CRT monitor at the same time.


Monitor Selection

This allows you to select one of the monitors from the given list of supported monitors. If your monitor is not in the list, then you should select the "Generic Multi-frequency" monitor or the "Universal Sync" monitor.

Some monitor types are supported only in certain screen sizes and colors. Certain monitors support more than one "Refresh Rate". The default refresh rate is automatically selected when the monitor type is changed.


Refresh

This allows you to select the Refresh Rate(s) supported by your monitor. The non-supported Refresh Rates are grayed out.


Cursor Animation

This changes the default hour glass cursor to a clock cursor.


Big Cursor

This makes the mouse cursor more visible by increasing the default cursor size.


OK

This allows you to save the current settings.


Cancel

This allows you to cancel any changes made to the Display Control Panel.


Version

This allows you to check the Driver Name, Date, Time, File Size and Version of the current display driver.


Help

The index contains a list of all Help topics available for the Chips Driver Control Panel. For information on how to use Help, press F1 or choose Using Help from the Help menu.