利用可能なリフレッシュ率を表示します。リストにあるリフレッシュ率をクリックして選択してください。この選択は、CRTモードでのみ利用できます。


選択されているビデオディスプレイデバイスを示します。必要なディスプレイデバイスをクリックしてセットしてください。

CRTを選択すると、ビデオはCRTでのみ表示されます。

LCDを選択すると、ビデオはフラットパネルでのみ表示されます。

BOTHを選択すると、ビデオはCRTとフラットパネルの両方で表示されます。


ロードされているドライバファイルの情報を表示します。


現在のディスプレイモードの解像度, 色およびモード番号を表示します。


現在選択されているモニタの情報を表示します。


ここをチェックすると、Windowsデフォルトリフレッシュ率が使用されます。Windowsは、モードが変更されるとモニタおよびディスプレイコントローラによって適切なリフレッシュ率を選択するので、この機能を利用することをおすすめします。

ここをチェックしないと、リフレッシュ率は固定されるので、モードを変更するとディスプレイは正常に機能しません。